From a49bcf20970214c12a0726c0f4bf4abb1a378ab2 Mon Sep 17 00:00:00 2001
From: Christian Hesse <mail@eworm.de>
Date: Thu, 28 Jan 2021 23:46:04 +0100
Subject: doc: update default build host

Commit 09e169b7418319eadfc4eab83fbf2fcc459d536e changed the default
build host from dragon.archlinux.org to build.archlinux.org - match
in documentation.

Signed-off-by: Christian Hesse <mail@eworm.de>
---
 doc/offload-build.1.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/offload-build.1.asciidoc')

diff --git a/doc/offload-build.1.asciidoc b/doc/offload-build.1.asciidoc
index 3633faa..5c9515f 100644
--- a/doc/offload-build.1.asciidoc
+++ b/doc/offload-build.1.asciidoc
@@ -28,7 +28,7 @@ Options
 	architecture officially supported by Arch Linux.
 
 *-s, --server* <hostname>::
-	Offload to a specific build server. The default is dragon.archlinux.org
+	Offload to a specific build server. The default is build.archlinux.org
 	which is used as part of the build toolchain for the official Arch Linux
 	repos.
 
-- 
cgit v1.2.3-70-g09d2

