From 01b6b0849ed098d4d3d8db3591443db3df6aa11b Mon Sep 17 00:00:00 2001
From: Levente Polyak <anthraxx@archlinux.org>
Date: Sun, 26 Nov 2023 00:37:47 +0100
Subject: doc(man): fix cut off page names by switching to modern asciidoctor

Asciidoc is the old reference implementation in Python, which has some
shortcoming. Specifically we are hitting cut off page names for long
subcommands. Fix this by switching to a more modern implementation named
asciidoctor.

During the migration, get rid of the explicit asciidoc.conf file that
was required to define a linkman macro, which is now supported out of
the box.

Fixes #170

Signed-off-by: Levente Polyak <anthraxx@archlinux.org>
---
 doc/man/mkarchroot.1.asciidoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'doc/man/mkarchroot.1.asciidoc')

diff --git a/doc/man/mkarchroot.1.asciidoc b/doc/man/mkarchroot.1.asciidoc
index a435852..99905c8 100644
--- a/doc/man/mkarchroot.1.asciidoc
+++ b/doc/man/mkarchroot.1.asciidoc
@@ -44,6 +44,6 @@ Options
 See Also
 --------
 
-linkman:pacman[1]
+pacman(1)
 
 include::include/footer.asciidoc[]
-- 
cgit v1.2.3-70-g09d2

